1

MPI Implementation Parameters l Each MPI implementation makes different choices about protocols, allocation of memory, etc.

l Some of these parameters can be adjusted for each run, some even during a run l Check vendor documentation. Parameters include

» IBM: MP_PRIORITY, MP_EAGER_LIMIT, ...

» SGI: MPI_THRESHOLD, MPI_BUFS_PER_PROC, ...

» LAM: MPI_GER

» MPICH: P4_SOCKBUFSIZE, ...